-50 -25 0 25 Y

10 20 30 40 50 60 70 80 90

Z

u: -4.8 -2.9 -1.0 1.0 2.9 4.9 6.8 8.7 10.7 12.6 14.5 16.5 18.4 20.3 22.3

Contours ofu-component of flow at location "B"(in m/s) (for 0 deg yaw case over GSS geometry)